1Changes between HIPPI-Serial Rev 2.1 and Rev 2.2January 19, 1996The only change was to remove annex A.3 which read:A.3 XMUX and XDEMUX availabilityApplied Micro Circuits Corporation (AMCC), partnumber S2026 is an example of a suitableXMUX, and part number S2027 is an exampleof a suitable XDEMUX. This information isgiven for the convenience of the users of thisstandard and does not constitute anendorsement by ANSI, or other publisher of thisstandard, of these products.This text was removed since AMCC no longer supports the devices as standard products due to lowvolume. AMCC has committed to supporting existing customers of the devices.Original annex A.4 was renumbered to A.3, and the table of contents fixed accordingly.